\chapter{Frontend Readout Rate Capabilities}

In this chapter, basics of FEE  readout and limits will be discussed

\section{Preliminary Material}

\begin{figure}[bth]
  \begin{center}
    \includegraphics*[width=8cm]{figs/fee_readout_sequence.png}
  \end{center}
  \caption{FEE event processing and readout sequence}
\end{figure}

\section{FEE Readout Basics}


\section{Rate Limits}
 Rate limits from deadtime and LV power consumption. 


\subsection{Deadtime}\label{sec:Power}


\subsection{Power Consumption}\label{sec:Power}

Limits in running from LV consumption 

\begin{description}
  \item[D18] 

    Typical current without triggering 92A; during operation up to 130A at rates of ...

  \item[...]

    ...

\end{description}


