\begin{abstract}

This document is to describe all technical detail of the ALICE Transition Radiation Detector (TRD).
All aspect of TRD such as detector design, electronics, integration, installation, and commissioning
should be covered. The document is open for everybody in TRD project to edit and add material.

\end{abstract}
